	if PPC
		IMPORT	GetApplLimit
		IMPORT	SystemZone
		IMPORT	ApplicationZone
		IMPORT	GZSaveHnd
		IMPORT	TopMem
		IMPORT	MemError
		IMPORT	GetZone
		IMPORT	NewHandle
		IMPORT	NewHandleSys
		IMPORT	NewHandleClear
		IMPORT	NewHandleSysClear
		IMPORT	HandleZone
		IMPORT	RecoverHandle
		IMPORT	RecoverHandleSys
		IMPORT	NewPtr
		IMPORT	NewPtrSys
		IMPORT	NewPtrClear
		IMPORT	NewPtrSysClear
		IMPORT	PtrZone
		IMPORT	MaxBlock
		IMPORT	MaxBlockSys
		IMPORT	StackSpace
		IMPORT	NewEmptyHandle
		IMPORT	NewEmptyHandleSys
		IMPORT	HLock
		IMPORT	HUnlock
		IMPORT	HPurge
		IMPORT	HNoPurge
		IMPORT	HLockHi
		IMPORT	TempNewHandle
		IMPORT	TempMaxMem
		IMPORT	TempFreeMem
		IMPORT	TempHLock
		IMPORT	TempHUnlock
		IMPORT	TempDisposeHandle
		IMPORT	TempTopMem
		IMPORT	InitApplZone
		IMPORT	SetZone
		IMPORT	CompactMem
		IMPORT	CompactMemSys
		IMPORT	PurgeMem
		IMPORT	PurgeMemSys
		IMPORT	FreeMem
		IMPORT	FreeMemSys
		IMPORT	ReserveMem
		IMPORT	ReserveMemSys
		IMPORT	MaxMem
		IMPORT	MaxMemSys
		IMPORT	SetGrowZone
		IMPORT	SetApplLimit
		IMPORT	MoveHHi
		IMPORT	DisposePtr
		IMPORT	SetPtrSize
		IMPORT	DisposeHandle
		IMPORT	SetHandleSize
		IMPORT	InlineGetHandleSize
		IMPORT	ReallocateHandle
		IMPORT	EmptyHandle
		IMPORT	HSetRBit
		IMPORT	HClrRBit
		IMPORT	MoreMasters
		IMPORT	BlockMove
		IMPORT	BlockMoveData
		IMPORT	HGetState
		IMPORT	HSetState
		IMPORT	SetApplBase
		IMPORT	MaxApplZone
		IMPORT	HoldMemory
		IMPORT	UnholdMemory
		IMPORT	LockMemory
		IMPORT	LockMemoryContiguous
		IMPORT	UnlockMemory
		IMPORT	DeferUserFn
		IMPORT	DebuggerGetMax
		IMPORT	DebuggerEnter
		IMPORT	DebuggerExit
		IMPORT	DebuggerPoll
		IMPORT	GetPageState
		IMPORT	PageFaultFatal
		IMPORT	DebuggerLockMemory
		IMPORT	DebuggerUnlockMemory
		IMPORT	EnterSupervisorMode
		IMPORT	StripAddress
		IMPORT	Translate24To32
		IMPORT	PtrToXHand
		IMPORT	HandAndHand
		IMPORT	PtrAndHand
	ENDIF
	